Synaptics TouchPad 機能の概観
Synapticsタッチパット機能の概観

Synapticsタッチパットはこれまでのマウスよりはるかにパワーアップされています。通常マウスに備わっている機能の他、以下のような新機能を装備しています。

•	  ボタンを押さずにパッドをタップ

•	  ボタンとタップのカスタマイズ

•	  アイコン、ウィンドウなどのオブジェクトをボタンなしでドラッグ

•	  タッチ感度の調整

•	  入力時の不意のポインティング防止機能(パーム チェック)

•	  スクロール バーを使わずに文書をスクロール

•	  文書のズームイン、ズームアウト、パン

•	  ポインタの長距離移動

•	  ポインタ動作の微調整

0	Synapticsタッチパットドライバで、システムに付属する他のポインティング デバイスも制御できます。Synapticsタッチパットドライバが制御するポインティング デバイスが複数あると、マウス コントロール パネルの Synaptics ページに、このドライバの制御下にあるすべてのポインティング デバイスがドロップダウン ボックスで一覧表示されます。対応するデバイスを選択して個々に設定を行うことができます。この際、特定のポインティング デバイスに適用されない設定は淡色表示されます。

関連項目

•	  アクセサリ

•	  よくある質問の解答集

•	  タッチパット 詳細情報

ボタンを押さずにパッドをタップ

パッド表面をタップすると、マウスの左ボタンやタッチパットボタン(タッチパットボタン)をクリックするのと同じ結果になります。通常、タップする方がボタンを使うより早くて便利です。ダブルクリックも、2 回タップするだけです。軽く素早くタップするのが正しい操作方法です。タップが強すぎたり、ゆっくりすぎたりすると正しく動作しないことがあります。

クリックの代わりにタップするだけ

ボタンとタップのカスタマイズ

一部製品を除き、タッチパットには 2 つのボタンがついており、従来のマウス ボタンと同様に機能します。このボタンの動作はカスタマイズすることができます。

タッチパット表面をタップしても、ボタンを押すのと同じ操作を行うことができます。パッド中央のタップは常に左クリック(ボタンの動作)と同じですが、タッチパット表面の四隅にはそれぞれ異なるボタン動作を設定することができます。この特殊な四隅の領域をタップ ゾーンと呼びます。四隅のタップ ゾーン、中央部、それに 2 つのボタンにより、タッチパットは 7 つのボタンを持つマウスの役割をすることになります。

カスタマイズ例

タッチパット を 3 ボタン マウスのように使用する場合を考えてみましょう。左 タッチパット ボタンを押すと中クリックと同じになるよう設定することができます。すでに説明したように、タッチパット のタップで左クリックと同じ、右 タッチパット ボタンで右クリックと同じ働きをします。さらに使いやすくするために、タッチパット 右上隅のタップ ゾーンが右クリックと同じ働きをするよう設定することができます。 下の図で、タッチパット 右上隅(赤い陰のついた部分)のタップは右クリックと同じ、それ以外の部分(グレーの部分)のタップは左クリックと同じ働きをします。

タッチパット 例

ボタンとタップ ゾーンに割り当てることのできる動作は多種多様です。Synaptics タッチパット デバイス ドライバには、以下の動作が内蔵機能として用意されています。サードパーティの タッチパット プラグイン ソフトウェアをインストールすると、これ以外の動作設定することもできます。

•	[スタート] ボタンにジャンプ     ポインタを Windows タスクバーの [スタート] ボタンにジャンプさせ、自動的に [スタート] メニューを開く動作です。

•	現在のアプリケーションのメニューにジャンプ    アプリケーションのウィンドウ メニューの左端のエントリ(通常は [ファイル] メニュー)にジャンプさせ、自動的にサブメニューを表示する動作です。

•	現在のアプリケーションを最小化    現在のアプリケーションのウィンドウを最小化する動作です。現在のアプリケーションのウィンドウが既に最小化されている場合は、ウィンドウのサイズと位置を元に戻します。

•	現在のアプリケーションを最大化    現在のアプリケーションのウィンドウを最大化(画面全体に広げる)する動作です。現在のアプリケーションのウィンドウが既に最大化されている場合は、ウィンドウのサイズと位置を元に戻します。

•	ユーザーが選択したプログラムの実行    指定したプログラムが、ボタンのクリック、またはタップ ゾーンのタップにより自動的に実行されます。

タップやボタンをカスタマイズするには、[マウスのプロパティ] ダイアログの [ボタン動作のプロパティ] ページを開きます。

アイコン、ウィンドウなどのオブジェクトをボタンなしでドラッグ

ポインタ移動の際にマウスや タッチパット のボタンを押したままにしておく必要がしばしば生じます(画面上でアイコンやウィンドウを移動するときなど)。この操作をドラッグといいます。クリック、ダブルクリックと同様、ドラッグもボタンを使用せずに行うことができます。

オブジェクトを移動、またはドラッグするには(左 タッチパット ボタンを押したままにするのと同じ)

1)	ポインタをオブジェクト上に重ね、2 回タップし、そのまま指を タッチパット から離さないでおきます。この操作は 1 回半タップとも呼ばれます。

2)	指を タッチパット 表面上でスライドさせ、選択したオブジェクトを移動します。

3)	指を離してオブジェクトをドロップします。

1 回半タップ

オブジェクトをドラッグしている最中に指がパッドの端に達してしまった場合も心配いりません。Synaptics タッチパット のドラッグ ロックという機能を使用すれば、パッドからいったん指を離してもドラッグそのまま続けることができます。断続的にパッド表面で指をスライドさせて、ウィンドウの端から端までオブジェクトをドラッグしてください。もう一度タップするとドラッグ ロック機能は終了します。 Synaptics タッチパット には、エッジ モーションという機能もあり、離れた場所へのドラッグに役立ちます。 詳細については、ポインタの長距離移動を参照してください。

タップ アンド ドラッグ機能とドラッグ ロック機能は、[マウスのプロパティ]  ダイアログの [タッチのプロパティ]ページにあります。

タッチ感度の調整

タッチパット が反応するのに必要な触圧の調整は、タッチ感度スライド バーで行います。スライド バーは [マウスのプロパティ]ダイアログの [タッチのプロパティ]ページにあります。

タッチ感度を高く設定しすぎると、タッチパット にごく軽く触れただけでも反応してしまいます。ポインタが思うように動かない場合は、感度を低く設定してみてください。感度を低く設定すると、ポインタを移動するために、しっかりしたタッチが必要になります。一般的には、少し軽目のタッチに設定しておくと使いやすいでしょう。

ポインティング スティックがある場合にも、触圧の調整は [タッチ感度] スライド バーで同様の方法で行います。

入力中のうっかりタッチの防止

手のひらや他の部分が タッチパット 表面にうっかり触れてしまうことがあります。その結果、ポインタの位置がずれてしまったり、必要ないタップを行ってしまうことになります。タッチパット に手が触れると、入力中にカーソル位置が移動し、その後に入力したテキストが誤った場所に表示されてしまうことがあります。それ以外にも入力したテキストが「勝手に」ハイライト表示され上書きされてしまうこともあります。このようなキーボードからの入力中に不意にポインタが移動してしまうことはかなり頻繁に発生するため、タッチパット には、入力中にポインタを不意に動かしてしまうことのないよう働く機能が装備されています。

入力中不意にポインタが移動してしまった場合は、[マウスのプロパティ] ダイアログの [タッチのプロパティ] ページにある [パーム チェック] スライド バーを調節します。スライド ボックスを右側の [最大] の方向にスライドさせます。 これで、入力中 タッチパット にうっかり触っても、ポインタ移動の問題はほとんど解消されます。

逆に、入力中、意図的に タッチパット でポインタの移動やクリックを行おうとしても、反応しないことがあります。 こういった場合は、スライド ボックスを左側の [最小] の方向にスライドさせます。 これで、入力中のポインタ移動が不意のタッチと見なされることは少なくなり、反応するようになります。

スクロール バーを使わずに文書をスクロール

バーチャル スクロール機能の使用により、文書のスクロールという、実行頻度の高い操作を、作業中の文書からポインタを移動せずに行うことができます。タッチパット の右端を上下に指でなぞるだけで、現在のウィンドウの内容が垂直にスクロールします。同様に、タッチパット の下端を左右に指でなぞると、現在のウィンドウの内容が水平にスクロールします。ポインタをわざわざ小さなスクロール バーに持っていく必要はありません。ポインタの場所に関係なく、文書をスクロールすることができます。

バーチャル スクロールは文書ウィンドウ(ワープロや表計算などの)だけでなく、ファイル リスト、フォント リスト、その他スクロールできる他のアイテムでも動作します。すなわち、スクロール バーのあるウィンドウで作業している場合は、バーチャル スクロールを使用することができるということになります。

バーチャル スクロールを使用すると、スクロールが便利になるだけではなく、スムーズになります。マウスでスクロール ボックスをドラッグしてスクロールする場合、マウス ボタンを離すまで文書ウィンドウを再表示しないアプリケーションが数多くあります。 バーチャル スクロール機能では、スクロール中にウィンドウの内容を再表示するようアプリケーションに強制するため、文書のナビゲートが容易になります。

バーチャル スクロールの使い方

バーチャル スクロール機能のカスタマイズは、[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページで行います。

文書のズームイン、ズームアウト、パン

ズーム、パン機能を使用できるのは、Microsoft Intellimouse をサポートしているアプリケーション上に限られていますのでご注意ください。Intellimouse 対応アプリケーションでは、ズームやパンにより長大な文書を素早く扱うことができます。文書内の離れたところにジャンプするには、ズームアウトしてから目的の位置をクリックし、ズームインします。対角線方向にパンすると、水平方向、垂直方向同時にスクロールすることができます。

ズームの仕方

パンの仕方

ポインタの長距離移動

オブジェクトのドラッグやバーチャル スクロールを使用した高速スクロール、ポインタの移動などを行っていた際に、突然 タッチパット の端に到達してしまったとしても心配はいりません。Synaptics タッチパット のエッジ モーション機能をお使いください。  エッジ モーション機能はポインタの長距離移動に役立つ機能です。タッチパット の端に達すると、タッチパット あるいは タッチパット の端から指を離すまで、ポインタ(バーチャル スクロールを使用している場合はスクロール ボックス)は同方向に動き続けます。

エッジ モーション速度は、触圧感応にすることも、一定にすることもできます。速度の触圧感応とは、強く押すほどオブジェクトやポインタが速く動くということです。

エッジ モーション機能は、[マウスのプロパティ]ダイアログの [エッジ モーションのプロパティ] ページで設定します。

ポインタ動作の微調整

Synaptics タッチパット には、他にもポインタの動かし方を調整するためのさまざまな機能があります。「追加機能一覧」を参照してください。


アクセサリ

タッチパット は厳格な作業のために設計された、生産性向上ツールですが、同時に楽しく作業することも大切だと考えました。そこで タッチパット の機能をいくつかお見せする 2 つの愉快なアプリケーションを同梱しました。  それが触圧グラフとユニークで不思議な Synaptics MoodPad です。

これら 2 つのアプリケーションを起動するには、タスクバーの [Synaptics タッチパット] アイコンを 1 回クリックし、[アクセサリ] メニューから目的のアプリケーションを選択します。

ソフトウェア開発者の方なら、触圧グラフや Mood Pad のようなアプリケーションはご自分で作成することができます(それも恐らくもっと有意義なものを)。これらのプログラムは、公表されている標準的なインタフェース(絶対座標データ、触圧データなど)を通じて タッチパット ドライバの高度な機能にアクセスしています。既存のアプリケーションを タッチパット 対応にすれば、インストールされている数百万台の Synaptics タッチパット をターゲットにすることができます。Synaptics タッチパット ドライバ アプリケーション プログラミング インタフェース(API)用のソフトウェア開発者キットを、WWW サイト http://www.synaptics.com にてご用意しています。または e-mail で DrTouchPad@synaptics.com までご請求ください。


よくある質問の解答集

よくある質問の解答集リスト

•	  バーチャル スクロールを使っていると、ポインタがスクロール バーにジャンプし、それから元の地点にジャンプして戻ってしまうのですが、これでいいのでしょうか?

•	  スクロール バーがあるのに、バーチャル スクロールが機能しないウィンドウがあるのはなぜですか?

•	  スムーズにスクロールするウィンドウもあるのに、スクロール時に内容がたまにしか再表示されないウィンドウがあるのはなぜですか?

•	  スクロール時にスクロール ボックスがジャンプし、ポインタのある場所に正確に移動しないことがあるのはなぜですか?

•	  Microsoft インターネット エクスプローラでバーチャル スクロールが正しく機能しないのはなぜですか?

•	  SHIFT キーまたは CTRL キーを押したままにしていると、ポインタの動きがやけに遅くなったり、垂直または水平にしか動かなくなったりします。なぜですか?

質問	 バーチャル スクロールを使っていると、ポインタがスクロール バーにジャンプし、それから元の地点にジャンプして戻ってしまうのですが、 これでいいのでしょうか?

答	はい、正常です。

質問	スクロール バーがあるのに、バーチャル スクロールが機能しないウィンドウがあるのはなぜですか?

答	スクロールするには、バーチャル スクロールからウィンドウのスクロール バーが「見えている」必要があります。スクロール バーが他のウィンドウの陰になって部分的に見えなくなっていたり、部分的に画面の外に出てしまっている場合、そのウィンドウではバーチャル スクロール機能はアクティブになりません。一般に、あるウィンドウでバーチャル スクロールを使うには、そのウィンドウのスクロール バー全体が画面内で完全に表示されている必要があります。ただし例外もあります。たいていの種類のウィンドウについて、バーチャル スクロール機能は特別の情報を持っているため、スクロール バーが画面上に表示されていなくてもスクロールすることができます。一部のアプリケーションで非標準的スクロール バーが使われていることがあり、その場合バーチャル スクロールの動作には信頼性がありません。

質問	スムーズにスクロールするウィンドウもあるのに、スクロール時に内容がたまにしか再表示されないウィンドウがあるのはなぜですか?

答	スクロール バーに対するウィンドウの反応の仕方は、そのウィンドウのアプリケーションに全面的に依存します。スムーズにスクロールするアプリケーションもあれば、スクロール バーを離すまで内容が更新されないアプリケーションもあります。バーチャル スクロール機能には、普及している多くのアプリケーション、およびウィンドウの種類に関する情報が貯えられているため、それを活用して多くのウィンドウを操り、スムーズにスクロールするすることができるようになっています(例えば、Microsoft (R) Word (TM) の文書ウィンドウは通常スムーズにスクロールしませんが、バーチャル スクロールを使うとスムーズにスクロールします)。バーチャル スクロール機能が特定の種類のウィンドウに関する情報を持たない場合でも、指の動きが遅くなったり停止した際にウィンドウに再表示を行わせ、スムーズなスクロールのように表示します。このように、文書の正しい場所まで正確にスクロールすることができるよう機能しています。

質問	スクロール時にスクロール ボックスがジャンプし、ポインタのある場所に正確に移動しないことがあるのはなぜですか?

答	実際にスクロール ボックスの動き方を支配しているのはアプリケーションです。ウィンドウの内容により、一部のアプリケーションでは、スクロール ボックスが特定の位置に移動するのを妨害することがあります。つまりスクロール ボックスがスクロール バーの特定の位置にしか静止しないということです。この場合、ポインタでスクロール ボックスをドラッグしても、それを離した瞬間、最終的に決まった位置にジャンプしてしまうということになります。残念ながら、バーチャル スクロール機能ではアプリケーションにより行われるスクロール バーの管理方法を制御することはできません。

質問	Microsoft インターネット エクスプローラでバーチャル スクロールが正しく機能しないのはなぜですか?

答	お使いのインターネット エクスプローラのバージョンが 4.01 以降であること、および [インターネット エクスプローラのプロパティ] ダイアログの [詳細設定] ページで [スムーズ スクロールの使用] オプションのチェックがオンになっていないことを確認してください。

質問	SHIFT キーまたは CTRL キーを押したままにしていると、ポインタの動きがやけに遅くなったり、垂直または水平にしか動かなくなったりします。なぜですか?

答	SHIFT キー、CTRL キーはさまざまな用途に使われます。例えば Microsoft Windows エクスプローラでの複数ファイルの選択や、Microsoft Excel でのスプレッド シートのズームイン、ズームアウトなどです。これらのキーはポインタの動きをカスタマイズするためにも使われます。ポインタの動きを遅くしたり、水平または垂直にのみ動くよう制限する、などです。例えば、左 SHIFT キーをスローモーション キーに割り当てることができます。 すると、左 SHIFT キーを押したままにしている間、ポインタの動きが通常より遅くなります。また、左 SHIFT キーを他の特殊動作に使用することもできますので覚えておいてください。Microsoft Windows エクスプローラでは、左 SHIFT キーを押したままにしておくと複数ファイルの選択を行うことができますが、同時にポインタの動きもゆっくりになります。

SHIFT キー、または CTRL キーを押したままにしている際にポインタの動作が緩慢になったり制限されたりした場合、そのような動作を無効にするためには、[マウスのプロパティ]ダイアログの [詳細機能のプロパティ] ページで該当するボックスのチェックをオフにしてください。


TouchPad 詳細情報
タッチパット 詳細情報

タッチパット ポインティング デバイスは、カリフォルニア州サン ノゼにある Synaptics, Inc. が自信を持ってお届けしています。本製品の性能と機能にご満足いただくことが弊社の願いです。最新情報、ソフトウェア アップデート情報については、下のアドレスにアクセスして、弊社 WWW サイトをご覧ください。  http://www.synaptics.comご意見、ご感想もお待ちしております。e-mail でお送りください。アドレスは以下の通りです。 DrTouchPad@synaptics.com

タッチパット は、熱や加えられた力でなく、指を容量検知方式により検出しています。指がパッドに近づくとパッド付近の電界が変化します。タッチパット のセンサーは、表面に電導路の格子をプリントした回路基板です。タッチパット 裏面の特殊チップが常時その電導路の容量を計測しており、それによって指の存在と位置が判断されます。

タッチパット を最大限に活用するには、タッチパット ドライバ ソフトウェアがインストールされていることを確認してください。Synaptics タッチパット ドライバが正しくインストールされている場合、[マウスのプロパティ] ダイアログの上部に、標準の [マウス] タブに加えていくつかの  [タッチパット] タブが表示されています。


[ボタン動作とタップ ゾーンのプロパティ] ページ

概観

 [ボタン動作とタッブ ゾーンのプロパティ]  ページでは、タッチパット ボタンに独自の動作を割り当てたり、タッチパット の 四隅の部分(またはタップ ゾーン)でのタップをカスタマイズしたりすることができます。詳細については「ボタンとタップのカスタマイズ」を参照してください。

Synaptics タッチパット ドライバでシステムに付属する他のポインティング デバイスも制御できます。Synaptics タッチパット ドライバが制御するポインティング デバイスが複数あると、マウス コントロール パネルの Synaptics ページに、このドライバの制御下にあるすべてのポインティング デバイスがドロップダウン ボックスで一覧表示されます。対応するデバイスを選択して個々に設定を行うことができます。この際、特定のポインティング デバイスに適用されない設定は淡色表示されます。

タップ ゾーンのカスタマイズ

タップ ゾーンが有効になっている場合、タッチパット の対応するタップ ゾーン領域内部でのタップに異なる意味や動作を与えることができます。例えば、右上隅のタップ ゾーンを右クリックとして定義することができます。この場合、タッチパット の右上隅を指でタップすると、マウスまたは タッチパット の右ボタンをクリックするのと同じ働きをします。

このページにある タッチパット の小さな領域図では、アクティブなタップ ゾーンを赤い陰で示しています。各ゾーンの脇には、そのゾーンの動作を指定するテキスト ボックスがあります。詳細については「タッチパット タップ ゾーン マップ」を参照してください。

カスタマイズするために

•	  タップ ゾーン機能をアクティブにするには、テキスト [タップ ゾーン機能を使用する] の脇にあるボックスのチェックをオンにします。ボックスのチェックがオフになっている状態では、タッチパット 表面のタップはすべて左クリックと同じ働きになります。

•	  特定ゾーンの動作を変更するには、まずそのゾーンに最も近いテキスト ボックスを見つけます。そのテキストボックスには、そのゾーンの現在の動作が表示されています(例えば[ゾーンなし]とある場合には、そのゾーンは無効になっており、そこでのタップはデフォルトの左クリックと同じ結果になります)。テキスト右の下方向ボタン[ [image] ]をクリックすると動作のリストが表示されます。希望の動作を選択します。

•	  各タップ ゾーンは、タッチパット マップ上にある黒いサイズ変更ハンドルをドラッグして、好みの大きさにサイズを変更することができます。

ボタン割り当てのカスタマイズ

タッチパット ボタンのカスタマイズは、タップゾーンのカスタマイズと同様に行ってください。

カスタマイズするために

•	各ボタンには、現在の動作を表示しているテキストボックスがあります(例えば、[左] とある場合は、左クリックまたは　 クリックと同じ)。動作のリストを表示するには、テキスト右側にある下方向ボタン[ [image] ]をクリックします。希望の動作を選択します。


[エッジ モーションのプロパティ] ページ

概観

[エッジ モーションのプロパティ] ページでは、タッチパット のポインタの長距離移動機能をカスタマイズすることができます。指が タッチパット の端に到達した際に、エッジ モーション機能を使用すると、指を離すまでポインタの移動は継続します。エッジ モーション機能の詳細については、「ポインタの長距離移動」を参照してください。

Synaptics タッチパット ドライバでシステムに付属する他のポインティング デバイスも制御できます。Synaptics タッチパット ドライバが制御するポインティング デバイスが複数あると、マウス コントロール パネルの Synaptics ページに、このドライバの制御下にあるすべてのポインティング デバイスがドロップダウン ボックスで一覧表示されます。対応するデバイスを選択して個々に設定を行うことができます。この際、特定のポインティング デバイスに適用されない設定は淡色表示されます。

エッジ モーション機能を有効にするには

このページで、希望するタイプのエッジ モーション機能に該当するボックスのチェックをオンにします。

•	  ドラッグ時

•	  常時

•	  スクロール時

エッジ ゾーン サイズのカスタマイズ

このページにある タッチパット の小さな領域図では、エッジ ゾーンを赤い陰で示しています。詳細なについては「タッチパット エッジ ゾーン マップ」を参照してください。各ゾーンのサイズは、タッチパット マップ上にある黒いサイズ変更ハンドルをドラッグして、好みの大きさに変更することができます。エッジ モーション機能をアクティブにする際に問題が生じる場合は、エッジ ゾーンを広げてみるといいかもしれません。

エッジ モーション速度のカスタマイズ

エッジ モーションがオンになっている間は、ポインタ(またはドラッグ中のオブジェクトやバーチャル スクロールのスクロール ボックス)の移動速度を触圧感応、または一定に設定することができます。速度を触圧感応にすると、圧力の強さに応じてオブジェクトやポインタの移動する速度が変化します。触圧感応に設定するには、[触圧でエッジ モーション速度を調整] と書かれたボックスのチェックをオンにします。

エッジ モーション速度を一定にしたい場合は、このページのエッジ モーション速度スライド バーで速度を調節することができます。


[タッチのプロパティ] ページ

概観

[タッチのプロパティ] ページでは、タッチパット でタップした際のレスポンスと感度をカスタマイズすることができます。

複数回タップ

[タッチのプロパティ] ページの [タップ] セクションで該当するボックスのチェックをオンにして、希望するタップ機能の設定を行います。

•	  タップにてクリック

•	  タップしてドラッグ

•	  ドラッグ ロック

タッチ感度

タッチパット が反応するまでに加える触圧の強度を調節するには、[タッチ感度] スライド バーを使います。「タッチ感度の調整」を参照してください。

パーム チェック

[パーム チェック] スライド バーで、タッチパット の不意なポインタ移動の感度を調節できます。タッチパット に手のひらが触れたのを感知するだけではなく、(うっかり タッチパット に触れたことにより)入力中に起こる不意なポインタ移動をほとんど無視できます。詳細については 「入力中のうっかりタッチの防止」を参照してください。

デバイスの無効化

このボックスのチェックをオンにすると、選択したデバイスが無効になります。コントロール パネルでは、システムに付属するポインティング デバイスをすべて無効にすることはできません。

ポインティング スティック固有のアイテム

ポインティング スティックがある場合には、それを選択すると「タップにてクリック」は「押して選択」になり、ポインティング スティックの押して選択機能の調節はこれで行います。

ポインティング スティックがある場合には、それを選択すると「タップしてドラッグ」は「ドラッグ機能使用」になり、ポインティング スティックの押して選択機能の調節はこれで行います。

ポインティング スティックがある場合には、それを選択すると「パームチェック」は「ペースを押して選択」になり、押して選択機能をオンにするのに必要なポインティング スティックの押下速度の調節はこれで行います。

ポインティング スティックがある場合には、それを選択すると、触圧の調整は [タッチ感度] スライド バーで行います。

関連項目

ボタンを使わずにアイコン ウィンドウ、その他のオブジェクトをドラッグする方法


[スクロールのプロパティ] ページ

概観

[スクロールのプロパティ] ページでは、タッチパット の バーチャル スクロール機能をカスタマイズすることができます。

バーチャル スクロールとは?

バーチャル スクロールの使い方

一部のアプリケーションでは、バーチャル スクロールの際に操作するスクロール ゾーンをズーム用にも使用することができます。

文書のズームイン、ズームアウト、パン

Synaptics タッチパット ドライバでシステムに付属する他のポインティング デバイスも制御できます。Synaptics タッチパット ドライバが制御するポインティング デバイスが複数あると、マウス コントロール パネルの Synaptics ページに、このドライバの制御下にあるすべてのポインティング デバイスがドロップダウン ボックスで一覧表示されます。対応するデバイスを選択して個々に設定を行うことができます。この際、特定のポインティング デバイスに適用されない設定は淡色表示されます。

アクティブ ウィンドウのバーチャル スクロールを有効にするには

このページで、希望するタイプのバーチャル スクロールに該当するボックスのチェックをオンにします。

•	  水平スクロール

•	  垂直スクロール

•	  惰性を利用

バーチャル スクロールを行う場所を選びます。

•	  選択したアイテムをスクロールします。

または

•	  ポインタで示したアイテムをスクロールします

スクロール ゾーン サイズのカスタマイズ

このページにある タッチパット の小さな領域図では、アクティブなスクロール ゾーンを赤い陰で示しています。詳細については「タッチパット スクロール ゾーン マップ」を参照してください。

各ゾーンのサイズは、タッチパット マップ上にある黒いサイズ変更ハンドルをドラッグして、好みの大きさに変更することができます。バーチャル スクロール機能をアクティブにする際に問題が生じる場合は、スクロール ゾーンを広げてみるといいかもしれません。スクロールしようとしていないのにスクロールしてしまう場合は、スクロール ゾーンを狭くしてみてください。

バーチャル スクロール速度のカスタマイズ

このページの [スクロール速度] スライド バーを調節して、バーチャル スクロールの速度を調整することができます。スライド ボックスを右にドラッグするとスクロールが速くなります。

関連項目

スクロール ボックスとは?


[詳細機能のプロパティ] ページ

概観

[詳細機能のプロパティ] ページでは、Synaptics タッチパット の以下の機能を制御することができます。

•	  ウィンドウの境界線でポインタを停止

•	  デフォルト ボタン上にポインタを移動

•	  スロー モーション キー

•	  ポインタ制約キー

•	  トレイ アイコン

•	  ポインタ リフレッシュ レート

Synaptics タッチパット ドライバでシステムに付属する他のポインティング デバイスも制御できます。Synaptics タッチパット ドライバが制御するポインティング デバイスが複数あると、マウス コントロール パネルの Synaptics ページに、このドライバの制御下にあるすべてのポインティング デバイスがドロップダウン ボックスで一覧表示されます。対応するデバイスを選択して個々に設定を行うことができます。この際、特定のポインティング デバイスに適用されない設定は淡色表示されます。


バーチャル スクロールの使い方

バーチャル スクロールの使い方

•	まず[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページで [水平スクロール] と [垂直スクロール] のどちらかまたは両方が有効になっている必要があります。次に、垂直スクロールの場合は タッチパット の右端に沿って指で上下になぞり、水平スクロールの場合は タッチパット の下端を左右になぞります。クリックやドラッグを行う必要はありません。現在のウィンドウにスクロール バーが表示されている場合、ウィンドウの内容がスクロールします。

バーチャル スクロールのために役立つヒント

•	スクロールの際に使用する タッチパット の右端および下端の部分をスクロール ゾーンといいます。スクロールするには、指をまずパッドのスクロール ゾーンに置いてください。パッドの他の場所に触れて指をスライドさせても、ウィンドウはスクロールしません。

•	スクロール ゾーンに指を置いて、右端に沿って上下に(または下端に沿って左右に)スライドさせるとスクロールが開始します。

•	スクロールを止めるには、指を離すか、またはスクロール ゾーンから外します。

•	バーチャル スクロール機能を使用する際に問題が生じたり、正しくスクロールしない場合は、スクロール ゾーンを広げてみてください。[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある タッチパット マップには、アクティブなスクロール ゾーンが赤い印で示されています。スクロール ゾーンの上にある黒いサイズ変更ハンドルをドラッグしてゾーンのサイズを変更します。

•	クリック、ドラッグはしないでください。クリックしてしまうとスクロールできません。

•	バーチャル スクロールでスクロールするときには、タスクバーの触圧計アイコンの色がブルーに変わります。バーチャル スクロールでない場合、アイコンの色はグリーンです。

•	バーチャル スクロールを行うことができるのは、通常現在選択されているウィンドウ上に限られます。スクロールできない場合は、該当するウィンドウをタップ、またはクリックしてみてください。あるいは、[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある [ポインタで示したアイテムをスクロール]を選択してください。

•	バーチャル スクロールの使い方についてより詳しく知りたい方は、[バーチャル スクロール入門] を起動してみてください。[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある[練習]ボタンを押すと、入門にアクセスすることができます。


ズームの仕方

Microsoft Intellimouse 対応アプリケーションでズームイン、ズームアウトを行う方法

•	まず [マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある [垂直スクロール]を有効にしてください。次に、CTRL キーを押したまま タッチパット の右端に沿って指で上下になぞります。

ズームのために役立つヒント

•	ズームの際に使用する タッチパット 右端の領域をスクロール ゾーンといいます。このゾーンで、垂直バーチャル スクロールとズームの両方を行うことができます。ズームするには、CTRL を押して、そのまま文書のバーチャル スクロールと同じ手順を行います。バーチャル スクロールのために役立つヒントは、そのままズームにも当てはまります。「バーチャル スクロールの使い方」で バーチャル スクロールのために役立つヒントをご覧ください。

•	Microsoft Excel など一部のアプリケーションでは、データ ズーミングがサポートされています。このようなアプリケーションでは、アウトラインのようなデータ構造の詳細の表示/非表示を切り替えることができます。例えば Microsoft Excel では、データの概要をアウトライン形式で表示しているセルにカーソルを重ね、データをズームインして詳細を表示することができます。データのズームを行うには、CTRL でなく SHIFT キーを押し、そのまま タッチパット 右端を指で上下になぞります。

•	すべてのアプリケーションがズームをサポートしているわけではありません。また、アプリケーションによってズームの方式は変化しますのでご注意ください。

•	ズームのテストを行うには、[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある[練習]ボタンを押して入門を起動してください。


パンの仕方

Microsoft Intellimouse 対応アプリケーションでパンを行う方法

1)	まず、中クリックの機能を果たすように タッチパット を設定する必要があります。方法については「ボタンとタップのカスタマイズ」を参照してください。それから、パンを開始するため、Microsoft Intellimouse 対応アプリケーションのウィンドウ内部の任意の場所を中クリックします。

2)	ポインタがこのような形のアイコンに変わります。  .アイコン中央の点は起点マークです。ポインタを起点マークから、パンする方向に動かします。ポインタを起点から遠くに動かすほど、パンは素早く行われます。

3)	希望の速度に達したら、指を離し、ウィンドウの内容が連続的にパンするのを見守ります。

4)	パン動作を停止するには、パッド表面のどこかをタップするか、タッチパット ボタンをクリックします。

パンするために役立つヒント

•	すべてのアプリケーションがパンをサポートしているわけではありません。また、アプリケーションによってパンの仕方は変化しますのでご注意ください。パンのことを自動スクロールと呼ぶアプリケーションもあります。また、パンする際に中ボタンを押したままにしておかねばならないアプリケーションもあります。

•	長い文書を斜め読みするときに、パンはとりわけ便利です。パンすることによって、文書を読みながら、ゆっくりと、スムーズかつ自動的にスクロールし続けることができます。内容を手動でスクロールするためにいちいち文書から目を離す必要はもうありません。

•	パンのテストをするには、[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある[練習]ボタンを押して入門を起動してください。


TouchPad タップ ゾーン マップ
タッチパット タップ ゾーン マップ

タップ ゾーンの タッチパット マップは、[マウスのプロパティ]ダイアログの[ボタン動作のプロパティ] ページにある、次のようなマップです。

タッチパット マップの例

マップには各タップ ゾーンのサイズと位置が示されています。アクティブなタップ ゾーンには赤く陰をつけてあります。赤いタップ ゾーンに対応する領域を指でタップすると、コーナー タップをしたことになります。[ボタン動作のプロパティ] ページでタップ ゾーンをカスタマイズすると、各コーナーをタップした際の動作を指定することができます。

マップの実物にはアニメーションが含まれています。パッドに触れていると、マップの四辺にある矢印で指の位置が示されます。指が タッチパット のタップ ゾーンのアクティブになっている領域に置かれていると、対応するタップ ゾーンがマップ上で赤い塗りつぶしに変化します。このアニメーションは、実際に タッチパット 上でタップ ゾーン領域の端を見つける際に役立ちます。

マップ上のタップ ゾーンのサイズは、黒いサイズ変更ハンドルをドラッグして調節してください。


TouchPad エッジ ゾーン マップ
タッチパット エッジ ゾーン マップ

エッジ ゾーンの タッチパット マップは、[マウスのプロパティ]ダイアログの [エッジモーションのプロパティ] ページにある、次のようなマップです。

タッチパット マップの例

このマップにはエッジ ゾーンのサイズと位置が示されています。エッジ モーション機能は、指が タッチパット のエッジ ゾーン領域にあるときに起動します。エッジ ゾーンとエッジ モーション機能のカスタマイズは、[エッジ モーションのプロパティ] ページで行います。

マップの実物にはアニメーションが含まれています。パッドに触れていると、マップの四辺にある矢印で指の位置が示されます。指が タッチパット のエッジ ゾーン領域に置かれていると、対応するエッジ ゾーンがマップ上で赤い塗りつぶしに変化します。このアニメーションは、実際に タッチパット 上でエッジ ゾーン領域の端を見つける際に役立ちます。

マップ上のエッジ ゾーンのサイズは、黒いサイズ変更ハンドルをドラッグして調節してください。


TouchPad スクロール ゾーン マップ
タッチパット スクロール ゾーン マップ

スクロール ゾーンの タッチパット マップは、[マウスのプロパティ]ダイアログの [スクロールのプロパティ] ページにある次のようなマップです。

タッチパット マップの例

このマップには水平スクロール ゾーンと垂直スクロール ゾーンのサイズと位置が示されています。アクティブなスクロール ゾーンは赤い陰になっており、アクティブでないスクロール ゾーンはライト グレーの陰になっています。指を タッチパット のスクロール ゾーン領域に置くと、バーチャル スクロールがアクティブになります。ゾーンのカスタマイズは、[スクロールのプロパティ] ページで行います。

マップの実物にはアニメーションが含まれています。パッドに触れていると、マップの四辺にある矢印で指の位置が示されます。指が タッチパット のスクロール ゾーン領域に置かれていると、対応するスクロール ゾーンがマップ上で赤い塗りつぶしに変化します。このアニメーションは、実際に タッチパット 上でスクロール ゾーン領域の端を見つける際に役立ちます。

マップ上のスクロール ゾーンのサイズは、黒いサイズ変更ハンドルをドラッグして調節してください。


[マウスのプロパティ] コントロール パネルの見つけ方
[マウスのプロパティ] ダイアログの見つけ方

[マウスのプロパティ] ダイアログの簡単な見つけ方

1)	時計のそばのタスクバーにあるSynaptics タッチパット トレイ アイコンをダブルクリックします。

[マウスのプロパティ] ダイアログの見つけ方の別の方法

1)	タスクバーの [スタート] メニュー ボタンをクリックします。

2)	[設定] のサブメニューから [コントロール パネル] フォルダをクリックします。

3)	[マウス] をダブルクリックします。

Synaptics タッチパット ドライバ ソフトウェアが正しくインストールされていれば、[マウスのプロパティ] ダイアログ内に、標準のマウス タブに加え、いくつかの タッチパット タブが表示されます。


スクロール ゾーン

スクロール ゾーンとは、バーチャル スクロールを行うために使用する タッチパット 上の領域のことです。バーチャル スクロールを開始するには、タッチパット 上のスクロール ゾーン領域に指を置いてください。

関連項目

•	  タッチパット スクロール ゾーン マップ

•	  バーチャル スクロールの仕方

•	  [スクロールのプロパティ] ページ


タップ ゾーン

タップ ゾーンは タッチパット の四隅にあります。タップ ゾーンでは、タップしたときに起こる動作を指定することができます。

関連項目

•	  ボタンとタップのカスタマイズ

•	  タッチパット タップ ゾーン マップ

•	  [ボタン動作のプロパティ] ページ


エッジ ゾーン

エッジ ゾーンとは、エッジ モーションをアクティブにする タッチパット 外縁周辺の領域です。

関連項目

•	  タッチパット エッジ ゾーン マップ

•	  [エッジ モーションのプロパティ] ページ


スクロール ボックス

スクロール ボックスとは、スクロール バーの上で移動する小さなボックスのことです。


サイズ変更ハンドル

サイズ変更ハンドルとは、ドラッグしてオブジェクトの大小を変更することのできる小さな黒い四角形[ [image] ]のことです。


ポインティング デバイスでの設定


これは Synaptics タッチパット ドライバのバージョン番号です。最新バージョンのドライバを入手するには、弊社ウェブ サイトにアクセスしてください。アドレスは次の通りです。 http://www.synaptics.com


タップ ゾーン

[タップ ゾーン]機能を使用すると、タッチパット で対応するタップ ゾーン領域をタップした際の動作を変更することができます。タップした際の動作はデフォルトで左クリックになります。タップ ゾーン領域でのタップをカスタマイズするには、[タップ ゾーン機能を使用する] ボックスのチェックをオンにして、各ゾーンのドロップダウン リストから動作を選択します。黒いサイズ変更ハンドルをドラッグすると、タップ ゾーンを広くしたり狭めたりすることができます。


タッチパット 左下隅でのタップに対応する動作を選択します。

例えば、中クリックを選択した場合、タッチパット の表面左下隅でのタップは中クリックと同じ結果になります。このタップ ゾーンを無効にするには、[ゾーンなし] を選択します(ゾーン内でのタップが、パッドの他の領域と同様、左クリックの動作になります)。


タッチパット 左上隅でのタップに対応する動作を選択します。

例えば、中クリックを選択した場合、タッチパット の表面左上隅でのタップは中クリックと同じ結果になります。  このタップ ゾーンを無効にするには、[ゾーンなし] を選択します(ゾーン内でのタップが、パッドの他の領域と同様、左クリックの動作になります)。


タッチパット 右上隅でのタップに対応する動作を選択します。

例えば、右クリックを選択した場合、タッチパット の表面右上隅でのタップは、マウスまたは タッチパット の右ボタンを押すのと同じ結果になります。  このタップ ゾーンを無効にするには、[ゾーンなし] を選択します(ゾーン内でのタップが、パッドの他の領域と同様、左クリックの動作になります)。


タッチパット 右下隅でのタップに対応する動作を選択します。

例えば、右クリックを選択した場合、タッチパット の表面右下隅でのタップは、マウスまたは タッチパット の右ボタンを押すのと同じ結果になります。  このタップ ゾーンを無効にするには、[ゾーンなし] を選択します(ゾーン内でのタップが、パッドの他の領域と同様、左クリックの動作になります)。


選択した動作のプロパティのダイアログを表示するにはこのボタンを押します。


これは タッチパット の小さな領域図で、アクティブなタップ ゾーンを赤い陰で示しています。  タップ ゾーンを広くしたり狭めたりするには、黒いサイズ変更ハンドルをドラッグします。マップの四辺にある矢印は、実際の タッチパット 上での指の位置を示しています。指が タッチパット のアクティブなタップ ゾーン領域に置かれている場合、マップ上で対応しているタップ ゾーンが赤の塗りつぶしに変化します。


ボタン

このセクションでは タッチパット ボタンをカスタマイズすることができます。詳細については [ヘルプ] ボタンがある場合には、それを押してみてください。


デフォルト

このページのすべての設定値をデフォルトの値に戻します。


エッジ モーション

エッジ モーションは、ポインタの長距離移動に役立つ機能です。指が タッチパット の端に達しても、その指を離すまでポインタが動き続けます。


ドラッグ時

オブジェクトのドラッグ時にエッジ モーションを有効にする場合は、このオプションを選択します。同時に [常時] ボックスのチェックをオンにしないで通常のポインタ移動を行っている間は、エッジ モーション機能は働きません。


常時

オブジェクトのドラッグ時、および通常のポインタ移動時にエッジ モーション機能を有効にするには、このオプションを選択します。


スクロール時

タッチパット バーチャル スクロール機能を使用する際エッジ モーションを有効にするには、このオプションを選択します。


これは タッチパット の小さな領域図で、エッジ ゾーンが赤い陰で示されています。エッジ ゾーンを広くしたり狭めたりするには、黒いサイズ変更ハンドルをドラッグします。マップの四辺にある矢印は、実際の タッチパット 上での指の位置を示しています。 指が タッチパット のエッジ ゾーン領域に置かれている場合、マップ上で対応するエッジ ゾーンが赤の塗りつぶしに変化します。


エッジ モーション速度

このセクションでは 指が タッチパット の端に達してからポインタが動き続ける速度をカスタマイズすることができます。  エッジ モーション速度は、触圧感応(強く押すと速くなる)にすることも、一定にすることもできます。


触圧でエッジ モーション速度を制御

指が タッチパット の端に達してからポインタが動き続ける速度は、一定に設定することも、触圧感応(強く押すとポインタの動きが速くなる)に設定することもできます。触圧感応にする場合は、このボックスのチェックをオンにします。


速度スライド バー

エッジ モーション速度は、一定にすることも、触圧感応にすることもできます。一定速度に設定する場合は、[触圧でエッジ モーション速度を制御] ボックスのチェックをオフにしてから、このスライド バーで設定する速度の値に調節します。エッジ モーション速度を速くするには、スライド ボックスを右側にドラッグします。


複数回タップ

このセクションでは、タッチパット のタップ機能をカスタマイズすることができます。詳細については、各項目のヘルプを選択してください。


タップにてクリック

このボックスのチェックがオンになっているときは、タッチパット の表面を指でタップするとマウスや タッチパットのボタンをクリックしたときと同じ動作になります。タップの動作は素早く行ってください。強く押す必要はありません。 [タップにてクリック] ボックスのチェックがオフになっている場合、クリックと同じ結果を得るには タッチパット ボタンを押さなければなりません。

0	ポインティング スティックがある場合には、それを選択すると、[タップにてクリック] は [押して選択] になり、ポインティング スティックを押して選択する機能の調節はこれで行います。


タップしてドラッグ

マウスや タッチパット のボタンを押さずにオブジェクトをドラッグするには、このボックスのチェックをオンにします。 ドラッグするには、まずオブジェクトを 2 回タップし、2 回目のタップ時に指で押したままにして タッチパット から離さないようにします。 指を タッチパット 表面上でスライドさせ、選択したオブジェクトを移動したら、指を離してオブジェクトをドロップします。

0	ポインティング スティックがある場合には、それを選択すると[タップしてドラッグ] は [ドラッグ機能使用] になり、ポインティング スティックを押して選択する機能の調節はこれで行います。


ドラッグ ロック

ドラッグ ロックは「タップしてドラッグ」と似た機能ですが、指を離してもドラッグしたままになる点が異なります。ドラッグ ロックの動作を終了するには、もう一度タップしてください。  ドラッグ ロック機能を使用すると、指を数回往復させて画面の端から端までオブジェクトをドラッグすることができます。


パーム チェック

このスライド バーでは、タッチパット の不意なポインタ移動の感度を調節できます。タッチパット に手のひらが触れたのを感知するだけではなく、(うっかり タッチパット に触れたことにより) 入力中に起こる不意なポインタ移動をほとんど無視できます。不意なポインタ移動やタップの問題でお困りの場合は、このスライド バーを右側に動かしてみてください。詳細については [ヘルプ] ボタンがある場合には、それを押してみてください。

0	ポインティング スティックがある場合には、それを選択すると[パームチェック] は [ペースを押して選択] になり、押して選択機能をオンにするのに必要なポインティング スティックの押下速度の調節はこれで行います。


タッチ感度

このスライド バーで、タッチパット が反応するまでに加える触圧の強度を調整します。ポインタの誤動作が起こる場合や、湿度の高い地域で作業する場合などは、このスライド バーを左に動かしてください。詳細については [ヘルプ] ボタンがある場合には、それを押してみてください。

0	ポインティング スティックがある場合には、それを選択すると、触圧の調整は [タッチ感度] スライド バーで行います。


バーチャル スクロール

タッチパット のバーチャル スクロール機能についての情報を得るには、[ヘルプ] ボタンがある場合には、それを押してみてください。


選択したアイテムのスクロール

このオプションを選択すると、バーチャル スクロール機能により、現在選択されている(反転表示されている)ウィンドウまたはつまみがスクロールします。


ポインタで示したアイテムのスクロール

このオプションを選択すると、バーチャル スクロール機能により、ポインタで示したウィンドウまたはつまみがスクロールします。  注:  [ポインタで示したアイテムのスクロール] 機能は、Windows95/98/ME 環境下のすべてのアプリケーションで機能するとは限りません。


惰性を利用

バーチャル スクロールは簡単なスクロールを実現する最新機能です。  [惰性を利用] は、長いスクロールが必要な場合に役立ちます。[惰性を利用] を有効にした場合、バーチャル スクロールを開始して、スクロール ボックスが動いている最中に指を離してください。スクロール ボックスはそのまま動き続けます。スクロール ボックスを止めるには、指をパッドの上に置いてください。慣れてくれば、スクロール ボックスをうまく操作して簡単にスクロールすることができるようになります。


水平スクロール

水平スクロール バーのあるウィンドウでバーチャル スクロールを使用可能にします。


垂直スクロール

垂直スクロール バーのあるウィンドウでバーチャル スクロールを使用可能にします。


これは タッチパット の小さな領域図で、スクロール ゾーンが赤い陰で示されています。また、アクティブでないゾーンはライト グレーの陰で示されています。スクロール ゾーンを広くしたり狭めたりするには、黒いサイズ変更ハンドルをドラッグしてください。 マップの四辺にある矢印は、実際の タッチパット 上での指の位置を示しています。指が タッチパット のスクロール ゾーン領域に置かれている場合、対応するスクロール ゾーンが赤の塗りつぶしに変化します。


練習

このボタンを押すとバーチャル スクロール入門が起動します。


スクロール速度

このスライド バーでバーチャル スクロールの速度を制御することができます。スライド ボックスを右にドラッグするとスクロールが速くなります。


ポインタの動作

このセクションでは、ポインタの動作をカスタマイズすることができます。詳細については、特定領域に関するヘルプを選択してください。


ウィンドウの境界線でポインタを停止

この機能は、ポインタがアクティブ ウィンドウの外に出ないよう、動きを制限します。ポインタをウィンドウの外側に動かそうとしても、境界線で停止します。再度外側に動かそうとすると、今度はポインタをウィンドウの外に動かすことができます。  ウィンドウの境界線でポインタが停止すると、ウィンドウの境界周辺にあるつまみ類が扱いやすくなります。例えば、ウィンドウを閉じたり、ウィンドウ サイズを変更したりする場合、クローズ ボックスやウィンドウの端の方めがけてポインタを動かすと、必要な場所にぴたりと止まってくれます。


スロー モーション キー

ドロー プログラムを使用しているときなどは、タッチパット でより正確にポインタを操作する必要が生じることがあります。ポインタの速度によっては、そうした正確さを求めることが難しい場合があります。そういう場合のため、スローモーション キーを指定することにより、ポインタがゆっくり動くようにすることができます。指定したキーを押したままポインタを動かすと、ポインタの動きが遅くなります。


デフォルト ボタン上にポインタを移動

画面にダイアログ ボックスが表示されているとき、この機能によってポインタが自動的にデフォルト ボタン上に移動します。


ポインタ制約キー

ポインタが水平方向、または垂直方向にのみ動くよう制限する場合に使用します。ポインタ制約キーを指定してから、そのキーを押したままポインタを移動します。ポインタの移動が開始したときの方向によって、動きが水平方向にのみ制限されるか、垂直方向にのみ制限されるかが決まります。


Synaptics タッチパット トレイ アイコン

Synaptics タッチパット トレイ アイコンは、Windows タスクバーの時計の近くに表示されます。2 種類のアイコンから選択してください。

	これはアニメーション触圧計アイコンです。触圧計のドットのサイズが、触圧の圧力総量を示します。バーチャル スクロールを行っている間は、アイコンがブルーに変化します。
	これはアニメーションを行わない Synaptics のロゴ アイコンです。
いずれかのトレイ アイコンをダブルクリックすると、[マウスのプロパティ] ダイアログを呼び出すことができます。


ポインタ リフレッシュ レート

ポインタの動きを一番スムーズにするには、ポインタ リフレッシュ レート [速い] を選択します。 ポインタが過度にゆれたりちらついたりする場合は、ポインタ リフレッシュ レート[遅い]を試してください。


[Synaptics タッチパット のプロパティ] ページでは、タッチパット の設定を行います。このページは [マウスのプロパティ] ダイアログにあります。


ここをクリックすると、インターネット ブラウザを起動し、直接リンク先に移動します。


パン

パンとは連続的にスクロールすることです。パンは水平にも、垂直にも、また斜めに行うこともできます。  パンは、Microsoft Intellimouse をサポートしているアプリケーションでのみ機能します。また、アプリケーションの多くはパンできる方向が制限されていますのでご注意ください。例えば、 Microsoft Word では垂直方向にしかパンすることができません。Microsoft Excel では垂直方向と水平方向は可能ですが、斜めにパンすることはできません。


ズーム

ズームとは文書の拡大率を変更することです。ズームインとは拡大率を上げること、ズームアウトとは拡大率を下げることです。  ズームは、Microsoft Intellimouseをサポートしているアプリケーションでのみ機能しますのでご注意ください。


スタート ボタンにジャンプ

この動作により、actionポインタが自動的にタスク バーの [スタート] ボタンに移動して [スタート] メニューを開きます。


現在のウィンドウのメニューにジャンプ

この動作により、ポインタが自動的に現在のウィンドウのメニューにある一番左のエントリ(通常は [ファイル] メニュー)に移動し、そのエントリを開きます。この機能は、ノン スタンダード メニューを持つ一部のアプリケーションでは機能しないことがあります。


現在のウィンドウの最小化

この動作により、現在のウィンドウが最小化されます。


現在のウィンドウの最大化

この動作により、現在のウィンドウが最大化され、画面全体に広がります。現在のウィンドウがすでに最大化されている場合、この動作によりウィンドウのサイズと位置が元に戻ります。


現在のウィンドウをデフォルトのサイズに戻す

このボタンの動作により、最小化、または最大化されたウィンドウのサイズと位置が元に戻ります。


ユーザが設定したプログラムの実行

この動作により、指定したプログラムが自動的に実行されます。動作を選択した後でコンボ ボックスの脇にある [プロパティ] ボタンをクリックして、実行するプログラムを選択してください。


TouchPad 全体をバーチャル スクロール ゾーンにするかどうかの切替
タッチパット 全体をバーチャル スクロール ゾーンにするかどうかの切替

この動作により、タッチパット の表面全体でバーチャル スクロール が制御されるようになります。対応するジェスチャーをもう 1 度実行すれば、通常の タッチパット の動作に戻ります。


前の Web ページを表示

Web ブラウザがアクティブになっていると、この動作によりブラウザの履歴バッファ内にある前のページを表示することができます。


次の Web ページを表示

Web ブラウザがアクティブになっていると、この動作によりブラウザの履歴バッファ内にある次のページを表示することができます。


デフォルト ブラウザの Web ページを表示

この動作により、デフォルトの Web ブラウザが起動され Web ページが表示されます。動作を選択した後でコンボ ボックスの脇にある [プロパティ] ボタンをクリックして、参照する Web ページを選択してください。


現在の Web ページを再ロード

Web ブラウザがアクティブになっていると、この動作により現在の Web ページが再ロードされます。


現在の Web ページのロードを停止

Web ブラウザがアクティブになっていると、この動作によりブラウザによる現在の Web ページのロードが停止します。


バーチャル スクロール入門

Synaptics タッチパット バーチャル スクロール入門へようこそ

この入門は迷路になっています。Synaptics タッチパット の便利な機能を学びながら脱出してください。バーチャル スクロールで迷路をスクロールすることも、ズームイン、ズームアウト、またパンすることもできます。ただし、このアプリケーションは Microsoft Intellimouse 対応です。ズームやパンは Microsoft Intellimouse 対応アプリケーションでしか機能しませんのでご注意ください。

タッチパット の便利な機能の学習

•	  バーチャル スクロールでスクロールする方法

•	  ズームイン、ズームアウトの仕方

•	  パンの仕方

迷路の脱出方法

•	黄色いドット {O} が迷路のスタート地点になります。そこをクリックすると開始です。方向キーや タッチパット を使って迷路を進んで行ってください。

•	迷路には 4 つの難度レベルがあります。デフォルトは最難関レベルになっていますので、スクロール、ズーム、パンを学習するエリアがたくさんあります。難度を変更するには 1 から 4 までの数字を押してください。1 が最も簡単、2 がやや簡単、3 がやや難しい、4 が最も難しいレベルになっています。レベルを変更すると、現在行っているゲームは無効になり、最初からやり直すことになります。

•	青いドット {O} が迷路の終点です。


[ジェスチャーのプロパティ] ページ

概観

ポインティング アプリケーションでは、通常、タッチパット 表面に置かれるのは 1 本の指だけですが、Synaptics タッチパット では タッチパット 表面に置かれた指が1 本か 2 本かを正確に判別できます。[ジェスチャーのプロパティ]  ページで 2 本の指を使ったジェスチャーにカスタマイズ可能な動作を設定することにより、この機能を有効利用することができます。

ジェスチャーにおいては指を動かす方向によって、タッチパット で実行される動作が決まります。8 方向のポインタの動きにそれぞれ別々の動作を設定することができます。ジェスチャーには、四隅のタップやボタンに設定可能な動作と同じものを設定することができます。詳細については、ボタンとタップのカスタマイズを参照してください。

ジェスチャー動作のカスタマイズ

2 本指ジェスチャーが有効になる場合、2 本指を使った8 方向の動作にそれぞれ異なる意味や動作を与えることができます。領域図では、タッチパット の左端が「西」、一番上つまり一番端が「北」になります。例えば、タッチパット の 左下から右上に 2 本指をすべらすと、北東のジェスチャーとして認識されます。

[ジェスチャーのプロパティ]  ページにある タッチパット の小さな領域図には、ジェスチャーの方向が赤い陰で示してあります。各方向の脇には、その方向の動作を指定するテキスト ボックスがあります。

カスタマイズするために

•	ジェスチャー機能をアクティブにするには、[機能を使用する]ボックスのチェックをオンにします。ボックスのチェックがオフになっている状態では、2 本指の動作は 1 本指の動作と同じ働きになります。

•	特定のジェスチャーの動作を変更するには、まずそのジェスチャーに最も近いテキスト ボックスを見つけます。そのテキスト ボックスには、そのジェスチャーの現在の動作が表示されています (例えば [ゾーンなし] とある場合には、そのジェスチャーは無効になっており、それを実行しても特に何も起こりません)。テキスト右の下方向ボタン{ [image] } をクリックすると、動作のリストが表示されます。希望の動作を選択します。


 2 本指ジェスチャー

タッチパット 表面に 2 本の指を置いてそれらを特定の方向に動かすことを 2 本指ジェスチャーと呼びます。タッチパット では、このような動作を8 方向それぞれで検出できます。このページでは、ジェスチャー検出時に タッチパット で実行される動作をカスタマイズできます。

ジェスチャー機能を有効にするには、[機能を使用する]ボックスのチェックをオンにします。次に、ドロップダウン リストからそれぞれのジェスチャー方向に設定する動作を選択します。


北西方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


北方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


北東方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


西方向の 2 本指ジェスチャーの動作を選択

例えば、Press the Page Up を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


南東方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


南方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


南西方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


西方向の 2 本指ジェスチャーの動作を選択

例えば、[Page Upキーを押す] を選択した場合、このように指を動かすと、キーボードから Page Upキーを押したのと同じ動作が実行されます。


キーボード マクロの記録と再生

この動作により、あらかじめ記録されている一連のキー操作が再生されます。この動作を選択した後、再生する一連のキー操作を記録できます。


[キーボード マクロの記録] ダイアログ

このダイアログ ボックスでは、一連のキー操作を記録することができます。このキー操作は、後で再生できます。このようなキー操作の記録のことをキーボード マクロと呼びます。

マクロの記録を開始するには、[スタート] ボタンを押します。[停止] ボタンがオンになり、[スタート] ボタンがオフになり処理中であることが示されます。記録中は、すべてのキー操作が傍受されるため、記録モードから抜けるには、マウスを使って [停止] ボタンを押す方法しかありません。

記録中以外であれば、[消去] ボタンを使ってキー操作バッファを空にすることができます。記録中、このボタンはバックスペース キーとして動作します。[戻る] ボタンを押すと、記録されたキー操作バッファから最後のエントリが削除されます。記録中は、マウスを使って [戻る] ボタンを押さなければならないので注意してください。

キー操作は記録されるのと同じものが、記録ダイアログのテキスト ウィンドウにも表示されます。英字、数字、句読点キーが、文書を入力したのと同じようにテキスト ウィンドウに表示されます。印刷可能キー以外は、中括弧に囲まれたニーモニック タグとしてテキスト ウィンドウには表示されます。

テキスト ウィンドウをより見やすくするため、ほとんどのキーはテキスト ウィンドウには押されたとき 1 回だけしか表示されませんが、モード キー(Shift やCtrl およびAlt) は押されたときと、キーから手が離されたときのどちらもテキスト ウィンドウに表示されます。これにより、テキスト ウィンドウを「読む」ことにより、キーボード モードの変更が分かるようになっています。

テキスト ウィンドウを直接編集することはできないので注意してください。例えば、すでに記録されている一連のキー操作の間にキーを挿入することはできません。これを行うには、記録されているバッファを消去し再度、必要なキー操作の順序を記録し直す必要があります。

記録が終了したら、[OK] ボタンを押して保存するか、[キャンセル] ボタンを押して記録を廃棄してください。どちらのボタンを押してもダイアログは終了します。


タッチパット ボタン動作を選択

ドロップダウン リストから動作を選択することでボタンをカスタマイズできます。


　　 マウス ボタンをダブルクリックする際のクリック間隔を調節。マウスの使用に慣れていない場合は、スライド バーを遅い方向にドラッグした方がダブルクリックは簡単になります。テスト領域の画像をダブルクリックして、ダブルクリックのテストを行うことができます。


マウスのタブルクリック速度をテストできる場所を提供。びっくり箱が現れたり消えたりすれば、ダブルクリックは認識されています。


画面上のポインタの動作速度を調整


 マウス ポインタを最大速度までどの程度高速化するか指定。高速化することにより、マウスを素早く動かしたときのマウス ポインタの動きがかなり速くなります。高速化を行わなければ、マウスの速度は一定です。


ポインタの軌跡を表示

マウス ポインタに軌跡を表示します。これは液晶ディスプレイ(LCD) の画面の方がより見やすくなっています。ポインタの軌跡の長さを変えるには、スライド バーをドラッグします。


スクロール機能を使用する

このボックスのチェックをオンにすると、共通スクロール機能がオンになります。スクロール機能を設定するには、設定ボタンをクリックします。


スクロールの設定

このボタンをクリックして、スクロール機能を設定します。


ジェスチャーの設定

このボタンをクリックして、2 本指ジェスチャー機能を設定します。


ジェスチャーの設定

このボタンをクリックして、3 本指ジェスチャーを設定します。


ゾーン領域の設定

このボタンをクリックして、タップ ゾーン機能を設定します。


エッジ モーションの設定

このボタンをクリックして、エッジ モーション機能を設定します。


デバイスの無効化

このボックスのチェックをオンにすると、選択したデバイスが無効になります。コントロール パネルでは、システムに付属するポインティング デバイスをすべて無効にすることはできません。


2 本指ジェスチャー

タッチパット の表面に 2 本の指を置いて特定の方向に動かすことを 2 本指ジェスチャーと呼びます。タッチパット では、このような動作を8 方向それぞれで検出できます。

ジェスチャー機能を有効にするには、[2 本指ジェスチャー機能を使用する]ボックスのチェックをオンにします。次に、2 本指設定ボタンをクリックして、2 本指ジェスチャー検出時に タッチパット で実行される動作をカスタマイズします。


3 本指ジェスチャー

タッチパット の表面に 3 本の指を置いて特定の方向に動かすことを 3 本指ジェスチャーと呼びます。タッチパット では、このような動作を8 方向それぞれで検出できます。

ジェスチャー機能を有効にするには、[3 本指ジェスチャー機能を使用する]ボックスのチェックをオンにします。次に、3 本指設定ボタンをクリックして、3 本指ジェスチャー検出時に タッチパット で実行される動作をカスタマイズします。


指ジェスチャー

タッチパット の表面に 2 または 3 本の指を置いて特定の方向に動かすことを指ジェスチャーと呼びます。タッチパット では、このような動作を8 方向それぞれで検出できます。

2 本または 3 本の指のジェスチャーを組み合わせて使用することができます。ジェスチャー機能を有効にするには、[機能を使用する] ボックスのチェックをオンにします。次に、設定ボタンをクリックして、3 本指ジェスチャー検出時にタッチパットで実行される動作をカスタマイズします。


このページの各アイテムのヘルプを使用。ダイアログ ボックスの一番上にある  ?  をクリックしてから、詳しく知りたいアイテムをクリックします。